TITL p1bwr in P-1
CELL  0.71069  11.9880  17.5410  19.6250   90.000  100.984   90.000
ZERR     2.00   0.0050   0.0050   0.0050    0.005    0.005    0.005
LATT   1
SFAC  C    H    B    P
UNIT  200  192  4    12
MERG   2
OMIT     -4.00 180.00
FMAP   2
PLAN   25
LIST   1
acta
WGHT     0.00000     9.41530
L.S.   4
FVAR     0.13289
P1    4   -0.106232    0.205885    0.199365    11.00000    0.02722    0.03003 =
        0.03131    0.00112    0.01009    0.00214
P2    4   -0.393679    0.705938    0.300680    11.00000    0.02612    0.03000 =
        0.03148   -0.00084    0.00993   -0.00304
P3    4   -0.126374    0.311565    0.249762    11.00000    0.04088    0.03182 =
        0.03001    0.00315    0.00745    0.01120
P4    4   -0.373497    0.811624    0.250409    11.00000    0.04267    0.03144 =
        0.03023   -0.00246    0.00798   -0.01172
P5    4   -0.030227    0.261487    0.340447    11.00000    0.03602    0.03501 =
        0.02796    0.00142    0.00548    0.00882
P6    4   -0.469777    0.761399    0.159471    11.00000    0.03461    0.03482 =
        0.02961   -0.00178    0.00711   -0.00873
C7    1   -0.417546    0.723607    0.387343    11.00000    0.03525    0.02667 =
        0.03358    0.00319    0.01184   -0.00075
C8    1    0.137206   -0.205784    0.302018    11.00000    0.02964    0.02735 =
        0.05482   -0.00174    0.00899   -0.00068
C9    1   -0.082083    0.223111    0.112974    11.00000    0.03608    0.02783 =
        0.03388   -0.00189    0.01308    0.00057
C10   1   -0.026482   -0.116065    0.337641    11.00000    0.03903    0.02658 =
        0.02507    0.00017    0.00362   -0.00322
C11   1   -0.637035    0.294770    0.197917    11.00000    0.03111    0.02908 =
        0.05024    0.00528    0.01072    0.00277
C12   1   -0.537257    0.407796    0.283190    11.00000    0.03364    0.03168 =
        0.03355    0.00268    0.00738   -0.00169
C13   1   -0.474172    0.384073    0.162898    11.00000    0.03386    0.02739 =
        0.03079   -0.00041    0.00165    0.00202
C14   1   -0.392754    0.700493    0.111252    11.00000    0.03964    0.03230 =
        0.02690   -0.00310    0.00562   -0.01254
C15   1    0.037320   -0.092233    0.217205    11.00000    0.03871    0.03025 =
        0.03308   -0.00488    0.00966   -0.00180
C16   1   -0.051215    0.148777    0.438516    11.00000    0.03556    0.04307 =
        0.03650    0.00271    0.00231    0.00795
AFIX   43
H16   2    0.027598    0.145380    0.446014    11.00000   -1.20000
AFIX    0
C17   1    0.035291    0.334675    0.398792    11.00000    0.03543    0.03940 =
        0.03263   -0.00082   -0.00021    0.00716
C18   1   -0.328972    0.167099    0.204809    11.00000    0.02902    0.04578 =
        0.04207    0.00826    0.01121    0.00825
AFIX   43
H18   2   -0.338876    0.218647    0.213015    11.00000   -1.20000
AFIX    0
C19   1   -0.586149    0.464771    0.316549    11.00000    0.02797    0.04749 =
        0.03546    0.00223    0.00609    0.00410
AFIX   43
H19   2   -0.651001    0.489170    0.292947    11.00000   -1.20000
AFIX    0
C20   1    0.185905   -0.060894    0.335492    11.00000    0.03920    0.03015 =
        0.02704    0.00760    0.00068   -0.00059
C21   1   -0.107694    0.199932    0.389465    11.00000    0.04345    0.03028 =
        0.02500    0.00241    0.00284    0.01126
C22   1    0.085498   -0.035116    0.183704    11.00000    0.02662    0.04406 =
        0.04049    0.00057    0.00992   -0.00130
AFIX   43
H22   2    0.149762   -0.010237    0.207496    11.00000   -1.20000
AFIX    0
C23   1   -0.449678    0.648596    0.061919    11.00000    0.04002    0.03607 =
        0.03560   -0.00496    0.00176   -0.00840
AFIX   43
H23   2   -0.528421    0.644612    0.054591    11.00000   -1.20000
AFIX    0
C24   1   -0.170644    0.666782    0.295665    11.00000    0.03808    0.04852 =
        0.04499   -0.00453    0.01358   -0.00636
AFIX   43
H24   2   -0.160411    0.718549    0.288659    11.00000   -1.20000
AFIX    0
C25   1   -0.535173    0.834236    0.101235    11.00000    0.03745    0.04080 =
        0.03452    0.00023    0.00406   -0.00827
C26   1   -0.685440    0.439316    0.164598    11.00000    0.03206    0.02437 =
        0.03303   -0.00391    0.00188   -0.00108
C27   1   -0.224325    0.141322    0.193302    11.00000    0.02497    0.04447 =
        0.03230    0.00572    0.00577    0.00142
C28   1   -0.276043    0.640840    0.306522    11.00000    0.02951    0.03706 =
        0.03122   -0.01107    0.00750   -0.00293
C29   1   -0.443212    0.327881    0.120181    11.00000    0.03736    0.03360 =
        0.03720    0.00298    0.00053    0.00159
AFIX   43
H29   2   -0.488028    0.284393    0.111416    11.00000   -1.20000
AFIX    0
C30   1   -0.491958    0.780662    0.396851    11.00000    0.04838    0.05207 =
        0.02744    0.00281    0.01225    0.01693
AFIX   43
H30   2   -0.529797    0.808017    0.358786    11.00000   -1.20000
AFIX    0
C31   1   -0.225968    0.203954    0.376973    11.00000    0.04635    0.05605 =
        0.03775    0.00945    0.01861    0.01794
AFIX   43
H31   2   -0.264857    0.236585    0.343273    11.00000   -1.20000
AFIX    0
C32   1   -0.636343    0.247103    0.254773    11.00000    0.04328    0.03944 =
        0.07611    0.00611    0.03197    0.00384
AFIX   43
H32   2   -0.605549    0.264986    0.298967    11.00000   -1.20000
AFIX    0
C33   1   -0.007492    0.280407    0.103142    11.00000    0.05408    0.04995 =
        0.03400   -0.00217    0.01723   -0.01513
AFIX   43
H33   2    0.030548    0.307803    0.141121    11.00000   -1.20000
AFIX    0
C34   1   -0.274168    0.703874    0.122923    11.00000    0.04517    0.05192 =
        0.04294   -0.00985    0.02049   -0.01900
AFIX   43
H34   2   -0.234950    0.736757    0.156276    11.00000   -1.20000
AFIX    0
C35   1    0.136608   -0.253120    0.245053    11.00000    0.04508    0.03708 =
        0.07055   -0.00682    0.02739   -0.00564
AFIX   43
H35   2    0.106443   -0.235347    0.200724    11.00000   -1.20000
AFIX    0
C36   1   -0.057032   -0.172403    0.379764    11.00000    0.03797    0.03707 =
        0.03620    0.00375    0.00370   -0.00921
AFIX   43
H36   2   -0.012063   -0.215845    0.388285    11.00000   -1.20000
AFIX    0
C37   1   -0.672479    0.499376    0.120849    11.00000    0.04592    0.02201 =
        0.03461   -0.00280    0.00154    0.00095
AFIX   43
H37   2   -0.600317    0.509684    0.112270    11.00000   -1.20000
AFIX    0
C38   1   -0.688441    0.263306    0.133301    11.00000    0.04746    0.03654 =
        0.07105   -0.00468    0.00757   -0.00703
AFIX   43
H38   2   -0.694913    0.293909    0.094046    11.00000   -1.20000
AFIX    0
C39   1   -0.134396    0.181330    0.056053    11.00000    0.05477    0.04261 =
        0.04005   -0.00530    0.01529   -0.01675
AFIX   43
H39   2   -0.184108    0.142258    0.061989    11.00000   -1.20000
AFIX    0
C40   1    0.171322   -0.000550    0.379139    11.00000    0.04452    0.02628 =
        0.03271    0.00218    0.00231   -0.00271
AFIX   43
H40   2    0.099080    0.009833    0.387548    11.00000   -1.20000
AFIX    0
C41   1   -0.401693    0.446857    0.171401    11.00000    0.04314    0.04053 =
        0.03784    0.00493    0.00852   -0.00933
AFIX   43
H41   2   -0.417682    0.486391    0.199624    11.00000   -1.20000
AFIX    0
B42   3    0.082212   -0.119108    0.297827    11.00000    0.03369    0.02520 =
        0.03366    0.00073    0.00597    0.00303
C43   1   -0.365701    0.681056    0.443512    11.00000    0.05758    0.04634 =
        0.04090    0.00256    0.01857    0.01744
AFIX   43
H43   2   -0.316373    0.641790    0.437466    11.00000   -1.20000
AFIX    0
C44   1    0.076696    0.203844    0.311385    11.00000    0.03460    0.03298 =
        0.03473   -0.00033    0.00167    0.00566
AFIX   23
H44A  2    0.133621    0.236281    0.297101    11.00000   -1.20000
H44B  2    0.114028    0.171266    0.348805    11.00000   -1.20000
AFIX    0
B45   3   -0.583474    0.381164    0.202381    11.00000    0.03810    0.02429 =
        0.03702   -0.00327    0.01338   -0.00578
C46   1   -0.796549    0.428865    0.176638    11.00000    0.04464    0.03088 =
        0.05706    0.00880   -0.00034   -0.00065
AFIX   43
H46   2   -0.809975    0.390137    0.206421    11.00000   -1.20000
AFIX    0
C47   1    0.040834   -0.013367    0.115065    11.00000    0.04383    0.06475 =
        0.03903    0.00568    0.01743   -0.00160
AFIX   43
H47   2    0.074794    0.025928    0.094575    11.00000   -1.20000
AFIX    0
C48   1    0.188306   -0.236757    0.366572    11.00000    0.05406    0.03789 =
        0.06649    0.00858    0.00573    0.01047
AFIX   43
H48   2    0.194656   -0.206108    0.405791    11.00000   -1.20000
AFIX    0
C49   1   -0.440663    0.372389    0.322220    11.00000    0.04456    0.05668 =
        0.03357    0.00222    0.00584    0.01519
AFIX   43
H49   2   -0.404775    0.334130    0.301635    11.00000   -1.20000
AFIX    0
C50   1    0.018092    0.155359    0.250266    11.00000    0.03109    0.03199 =
        0.04401    0.00266    0.00400    0.00878
AFIX   23
H50A  2   -0.006624    0.107623    0.267462    11.00000   -1.20000
H50B  2    0.071706    0.143707    0.220438    11.00000   -1.20000
AFIX    0
C51   1   -0.209864    0.063251    0.181831    11.00000    0.02696    0.04468 =
        0.04439    0.00637    0.00508   -0.00172
AFIX   43
H51   2   -0.140564    0.045087    0.173923    11.00000   -1.20000
AFIX    0
C52   1    0.296778   -0.071052    0.323170    11.00000    0.03913    0.03689 =
        0.05272   -0.01031   -0.00151   -0.00100
AFIX   43
H52   2    0.310023   -0.109577    0.293138    11.00000   -1.20000
AFIX    0
C53   1   -0.097702   -0.053321    0.328523    11.00000    0.03803    0.04184 =
        0.04072   -0.00756    0.01049    0.00509
AFIX   43
H53   2   -0.081018   -0.013895    0.300402    11.00000   -1.20000
AFIX    0
C54   1   -0.058839   -0.128046    0.178543    11.00000    0.03688    0.05413 =
        0.03482   -0.00405    0.01189   -0.01248
AFIX   43
H54   2   -0.094138   -0.166634    0.199093    11.00000   -1.20000
AFIX    0
C55   1   -0.577058    0.704084    0.188722    11.00000    0.03902    0.03506 =
        0.03468   -0.00017    0.00837   -0.00476
AFIX   23
H55A  2   -0.633850    0.736714    0.202911    11.00000   -1.20000
H55B  2   -0.614520    0.671427    0.151402    11.00000   -1.20000
AFIX    0
C56   1   -0.518737    0.655844    0.249853    11.00000    0.03203    0.03045 =
        0.04697    0.00355    0.00699   -0.00685
AFIX   23
H56A  2   -0.494519    0.607902    0.232775    11.00000   -1.20000
H56B  2   -0.572369    0.644580    0.279768    11.00000   -1.20000
AFIX    0
C57   1   -0.081952    0.617566    0.295114    11.00000    0.02516    0.07614 =
        0.06003   -0.00782    0.00983    0.00557
AFIX   43
H57   2   -0.012543    0.635992    0.287636    11.00000   -1.20000
AFIX    0
C58   1   -0.540682    0.486734    0.384893    11.00000    0.04138    0.07007 =
        0.04016   -0.00762    0.01849    0.00349
AFIX   43
H58   2   -0.574018    0.526291    0.405425    11.00000   -1.20000
AFIX    0
C59   1   -0.041787    0.255172   -0.019152    11.00000    0.07146    0.06188 =
        0.03810    0.00278    0.01903   -0.01489
AFIX   43
H59   2   -0.029025    0.265910   -0.063438    11.00000   -1.20000
AFIX    0
C60   1   -0.308343    0.454306    0.140962    11.00000    0.04202    0.05933 =
        0.05688    0.01665    0.01143   -0.00868
AFIX   43
H60   2   -0.265228    0.498670    0.148186    11.00000   -1.20000
AFIX    0
C61   1   -0.052082   -0.049598    0.078334    11.00000    0.05252    0.07054 =
        0.03092    0.00258    0.00804    0.00218
AFIX   43
H61   2   -0.080959   -0.035797    0.032622    11.00000   -1.20000
AFIX    0
C62   1   -0.199749    0.513961    0.317348    11.00000    0.04718    0.03884 =
        0.05546   -0.01452    0.00086    0.01002
AFIX   43
H62   2   -0.208859    0.462135    0.324661    11.00000   -1.20000
AFIX    0
C63   1   -0.192778   -0.045805    0.358972    11.00000    0.04076    0.05923 =
        0.05640   -0.02338    0.01073    0.00423
AFIX   43
H63   2   -0.236941   -0.001925    0.351362    11.00000   -1.20000
AFIX    0
C64   1   -0.299702    0.013197    0.182350    11.00000    0.03764    0.04145 =
        0.06004    0.01054    0.00261   -0.00938
AFIX   43
H64   2   -0.290561   -0.038572    0.174782    11.00000   -1.20000
AFIX    0
C65   1   -0.221506   -0.102336    0.399845    11.00000    0.04053    0.08391 =
        0.04443   -0.01951    0.01388   -0.01171
AFIX   43
H65   2   -0.285168   -0.097844    0.420223    11.00000   -1.20000
AFIX    0
C66   1   -0.289751    0.562897    0.318304    11.00000    0.02284    0.04018 =
        0.05025   -0.00685    0.00536   -0.00120
AFIX   43
H66   2   -0.358567    0.544346    0.326661    11.00000   -1.20000
AFIX    0
C67   1    0.387496   -0.025462    0.354349    11.00000    0.03227    0.04762 =
        0.07932    0.01096   -0.00692   -0.00392
AFIX   43
H67   2    0.459652   -0.034270    0.345100    11.00000   -1.20000
AFIX    0
C68   1   -0.459077    0.754835    0.518177    11.00000    0.07342    0.06749 =
        0.03559   -0.00139    0.02067    0.01726
AFIX   43
H68   2   -0.472860    0.765247    0.562298    11.00000   -1.20000
AFIX    0
C69   1   -0.277386    0.398064    0.100332    11.00000    0.03534    0.09370 =
        0.03624    0.01702    0.01022    0.00464
AFIX   43
H69   2   -0.212865    0.402414    0.080757    11.00000   -1.20000
AFIX    0
C70   1   -0.272963    0.608299    0.036053    11.00000    0.05715    0.05438 =
        0.03543   -0.00051    0.01912    0.00573
AFIX   43
H70   2   -0.232565    0.577430    0.010797    11.00000   -1.20000
AFIX    0
C71   1   -0.227537    0.108147    0.464157    11.00000    0.06178    0.04669 =
        0.04021    0.00157    0.02710   -0.00175
AFIX   43
H71   2   -0.268074    0.077141    0.489217    11.00000   -1.20000
AFIX    0
C72   1   -0.513658    0.842340    0.034635    11.00000    0.05065    0.04749 =
        0.04172    0.00542    0.01636   -0.00629
AFIX   43
H72   2   -0.465225    0.808291    0.018456    11.00000   -1.20000
AFIX    0
C73   1   -0.418320    0.117242    0.204219    11.00000    0.02044    0.07874 =
        0.06075    0.00898    0.00843   -0.00543
AFIX   43
H73   2   -0.488463    0.135471    0.210580    11.00000   -1.20000
AFIX    0
C74   1   -0.447648    0.450223    0.421362    11.00000    0.05945    0.07085 =
        0.02799   -0.00181    0.00871    0.00206
AFIX   43
H74   2   -0.418543    0.464257    0.466984    11.00000   -1.20000
AFIX    0
C75   1    0.012418    0.342029    0.465668    11.00000    0.04720    0.04135 =
        0.04556   -0.00390    0.01318    0.00687
AFIX   43
H75   2   -0.036276    0.308032    0.481673    11.00000   -1.20000
AFIX    0
C76   1    0.011255    0.297515    0.036823    11.00000    0.06353    0.06864 =
        0.04853    0.00247    0.02620   -0.03055
AFIX   43
H76   2    0.059392    0.337365    0.030433    11.00000   -1.20000
AFIX    0
C77   1    0.110819    0.385731    0.376915    11.00000    0.04632    0.05748 =
        0.03810   -0.00033    0.00480    0.00384
AFIX   43
H77   2    0.128426    0.380369    0.333016    11.00000   -1.20000
AFIX    0
C78   1   -0.154079   -0.166273    0.410275    11.00000    0.05331    0.06183 =
        0.03566    0.00124    0.01368   -0.02871
AFIX   43
H78   2   -0.172613   -0.205806    0.437675    11.00000   -1.20000
AFIX    0
C79   1    0.181176   -0.327781    0.253621    11.00000    0.04999    0.04296 =
        0.11395   -0.02950    0.05556   -0.01670
AFIX   43
H79   2    0.180961   -0.358184    0.214774    11.00000   -1.20000
AFIX    0
C80   1   -0.763088    0.545151    0.089041    11.00000    0.06991    0.03430 =
        0.03611    0.00111   -0.00342    0.00614
AFIX   43
H80   2   -0.750285    0.584121    0.059330    11.00000   -1.20000
AFIX    0
C81   1   -0.886876    0.474492    0.145502    11.00000    0.03970    0.04518 =
        0.07700   -0.00625   -0.00821    0.00495
AFIX   43
H81   2   -0.959081    0.465438    0.154574    11.00000   -1.20000
AFIX    0
C82   1   -0.114082    0.196634   -0.009117    11.00000    0.06781    0.07581 =
        0.03130   -0.01453    0.02031   -0.02357
AFIX   43
H82   2   -0.149172    0.167444   -0.046700    11.00000   -1.20000
AFIX    0
C83   1    0.263624    0.045227    0.410918    11.00000    0.06506    0.03177 =
        0.03823    0.00058   -0.00758   -0.01162
AFIX   43
H83   2    0.251122    0.084452    0.440452    11.00000   -1.20000
AFIX    0
C84   1   -0.103131   -0.107288    0.109862    11.00000    0.04975    0.06966 =
        0.03702   -0.00273   -0.00206   -0.01612
AFIX   43
H84   2   -0.166811   -0.132170    0.085338    11.00000   -1.20000
AFIX    0
C85   1   -0.095858    0.540673    0.305671    11.00000    0.04261    0.06425 =
        0.05728   -0.01296    0.01192    0.01256
AFIX   43
H85   2   -0.036192    0.506975    0.304980    11.00000   -1.20000
AFIX    0
C86   1    0.371005    0.033017    0.399121    11.00000    0.04851    0.03373 =
        0.06089    0.00755   -0.02088   -0.01189
AFIX   43
H86   2    0.431481    0.063116    0.420539    11.00000   -1.20000
AFIX    0
C87   1   -0.610820    0.885223    0.123006    11.00000    0.05055    0.05115 =
        0.04115   -0.00159    0.00603    0.00144
AFIX   43
H87   2   -0.628475    0.879654    0.166872    11.00000   -1.20000
AFIX    0
C88   1   -0.724796    0.144899    0.181878    11.00000    0.04754    0.04102 =
        0.13356   -0.00416    0.04954   -0.00844
AFIX   43
H88   2   -0.751374    0.095037    0.176459    11.00000   -1.20000
AFIX    0
C89   1   -0.346069    0.334450    0.089583    11.00000    0.04034    0.06737 =
        0.04058    0.00234    0.01443    0.02409
AFIX   43
H89   2   -0.328139    0.295179    0.061703    11.00000   -1.20000
AFIX    0
C90   1   -0.387162    0.696844    0.509328    11.00000    0.07699    0.07647 =
        0.03623    0.01210    0.02088    0.02316
AFIX   43
H90   2   -0.352566    0.667933    0.547230    11.00000   -1.20000
AFIX    0
C91   1   -0.110176    0.103932    0.475386    11.00000    0.05327    0.04276 =
        0.03689    0.00537    0.00814    0.00309
AFIX   43
H91   2   -0.071702    0.070268    0.508290    11.00000   -1.20000
AFIX    0
C92   1   -0.635646    0.950857    0.014776    11.00000    0.04869    0.04711 =
        0.06456    0.01904   -0.00868   -0.00647
AFIX   43
H92   2   -0.668610    0.990047   -0.014119    11.00000   -1.20000
AFIX    0
C93   1   -0.396930    0.392690    0.390670    11.00000    0.04148    0.07143 =
        0.03542    0.00426   -0.00656    0.01599
AFIX   43
H93   2   -0.333797    0.367492    0.415488    11.00000   -1.20000
AFIX    0
C94   1   -0.403419    0.040657    0.194217    11.00000    0.04007    0.06384 =
        0.05277    0.01488    0.00343   -0.01827
AFIX   43
H94   2   -0.462904    0.006945    0.195375    11.00000   -1.20000
AFIX    0
C95   1   -0.511088    0.797795    0.463069    11.00000    0.07482    0.06239 =
        0.04845    0.00188    0.02284    0.03097
AFIX   43
H95   2   -0.558614    0.837927    0.469653    11.00000   -1.20000
AFIX    0
C96   1   -0.389423    0.604154    0.024865    11.00000    0.05292    0.04510 =
        0.03431   -0.00835    0.00172   -0.00585
AFIX   43
H96   2   -0.427581    0.570683   -0.008334    11.00000   -1.20000
AFIX    0
C97   1    0.135897    0.451149    0.484596    11.00000    0.05977    0.04272 =
        0.06281   -0.01604   -0.01316    0.00709
AFIX   43
H97   2    0.169053    0.490400    0.513345    11.00000   -1.20000
AFIX    0
C98   1   -0.870880    0.533128    0.101246    11.00000    0.04664    0.03896 =
        0.06476   -0.00538   -0.01886    0.01091
AFIX   43
H98   2   -0.931319    0.563556    0.080340    11.00000   -1.20000
AFIX    0
C99   1   -0.216010    0.658302    0.084795    11.00000    0.05012    0.06509 =
        0.05702   -0.01306    0.02791   -0.01210
AFIX   43
H99   2   -0.137175    0.661182    0.091923    11.00000   -1.20000
AFIX    0
C100  1   -0.681317    0.171932    0.247231    11.00000    0.05055    0.04439 =
        0.11307    0.03045    0.05315    0.01900
AFIX   43
H100  2   -0.681302    0.141471    0.286018    11.00000   -1.20000
AFIX    0
C101  1    0.224798   -0.356162    0.318391    11.00000    0.04435    0.03425 =
        0.14108    0.00150    0.04026    0.00091
AFIX   43
H101  2    0.250874   -0.406141    0.323801    11.00000   -1.20000
AFIX    0
C102  1   -0.729572    0.189819    0.125098    11.00000    0.05516    0.03503 =
        0.10405   -0.00791    0.00933   -0.01087
AFIX   43
H102  2   -0.760252    0.171234    0.081139    11.00000   -1.20000
AFIX    0
C103  1   -0.283977    0.158439    0.415732    11.00000    0.05145    0.06606 =
        0.06242    0.01545    0.03419    0.01084
AFIX   43
H103  2   -0.362738    0.161787    0.409024    11.00000   -1.20000
AFIX    0
C104  1    0.159218    0.443601    0.419425    11.00000    0.05263    0.05129 =
        0.06336   -0.00600   -0.00094   -0.00926
AFIX   43
H104  2    0.208076    0.477835    0.403874    11.00000   -1.20000
AFIX    0
C105  1    0.229274   -0.309976    0.374574    11.00000    0.04743    0.03705 =
        0.11565    0.00724    0.00308    0.00943
AFIX   43
H105  2    0.260264   -0.328109    0.418648    11.00000   -1.20000
AFIX    0
C106  1   -0.563420    0.900366   -0.007674    11.00000    0.06720    0.06111 =
        0.04334    0.00870    0.00542   -0.00868
AFIX   43
H106  2   -0.547789    0.905351   -0.052093    11.00000   -1.20000
AFIX    0
C107  1   -0.659350    0.943173    0.080937    11.00000    0.04629    0.04780 =
        0.07546    0.00022   -0.00264    0.00429
AFIX   43
H107  2   -0.708125    0.977352    0.096636    11.00000   -1.20000
AFIX    0
C108  1    0.063136    0.400544    0.507806    11.00000    0.06766    0.05942 =
        0.04424   -0.01082    0.00165    0.01027
AFIX   43
H108  2    0.048031    0.405858    0.552319    11.00000   -1.20000
AFIX    0
HKLF    4
END
